-14.618 -14.617 -14.616 -14.615 μ / pN

P(μ) μ = -14.62 ± 0.00 pN

0.064 0.065 0.066 σ / pN

P(σ) σ = 0.07 ± 0.00 pN

100 120 140 τ / ms

P(τ) τ = 118.64 ± 4.69 ms

-13.984 -13.982 -13.98 μ / pN μ = -13.98 ± 0.00 pN

0.067 0.068 0.069 0.07 σ / pN σ = 0.07 ± 0.00 pN

45 50 55 60 τ / ms τ = 52.60 ± 2.03 ms