-14.234 -14.233 -14.232 μ / pN

P(μ) μ = -14.23 ± 0.00 pN

0.063 0.0635 0.064 0.0645 σ / pN

P(σ) σ = 0.06 ± 0.00 pN

300 350 400 450 τ / ms

P(τ) τ = 379.17 ± 15.87 ms

-13.61 -13.605 -13.6 μ / pN μ = -13.61 ± 0.00 pN

0.072 0.074 0.076 0.078 σ / pN σ = 0.07 ± 0.00 pN

20 25 30 35 τ / ms τ = 26.80 ± 1.09 ms