-15.13 -15.128 -15.126 μ / pN

P(μ) μ = -15.13 ± 0.00 pN

0.067 0.068 0.069 σ / pN

P(σ) σ = 0.07 ± 0.00 pN

45 50 55 60 τ / ms

P(τ) τ = 49.12 ± 1.60 ms

-14.496 -14.495 -14.494 -14.493 μ / pN μ = -14.50 ± 0.00 pN

0.064 0.065 0.066 σ / pN σ = 0.07 ± 0.00 pN

80 90 100 110 τ / ms τ = 98.79 ± 3.34 ms