-15.47 -15.465 -15.46 μ / pN

P(μ) μ = -15.47 ± 0.00 pN

0.08 0.085 0.09 σ / pN

P(σ) σ = 0.09 ± 0.00 pN

14 16 18 20 τ / ms

P(τ) τ = 16.28 ± 0.62 ms

-14.838 -14.837 -14.836 μ / pN μ = -14.84 ± 0.00 pN

0.0695 0.07 0.0705 0.071 σ / pN σ = 0.07 ± 0.00 pN

250 300 350 τ / ms τ = 295.00 ± 12.06 ms