-15.216 -15.214 -15.212 μ / pN

P(μ) μ = -15.21 ± 0.00 pN

0.072 0.074 0.076 0.078 σ / pN

P(σ) σ = 0.07 ± 0.00 pN

25 30 35 τ / ms

P(τ) τ = 30.12 ± 1.04 ms

-14.586 -14.585 -14.584 μ / pN μ = -14.59 ± 0.00 pN

0.067 0.068 0.069 σ / pN σ = 0.07 ± 0.00 pN

120 140 160 180 τ / ms τ = 153.25 ± 5.40 ms