-14.98 -14.975 -14.97 μ / pN

P(μ) μ = -14.97 ± 0.00 pN

0.082 0.084 0.086 σ / pN

P(σ) σ = 0.08 ± 0.00 pN

25 30 35 40 τ / ms

P(τ) τ = 33.23 ± 1.09 ms

-14.356 -14.354 -14.352 μ / pN μ = -14.35 ± 0.00 pN

0.077 0.078 0.079 σ / pN σ = 0.08 ± 0.00 pN

80 100 120 140 τ / ms τ = 110.26 ± 3.70 ms