-14.226 -14.225 -14.224 μ / pN

P(μ) μ = -14.22 ± 0.00 pN

0.072 0.0725 0.073 0.0735 σ / pN

P(σ) σ = 0.07 ± 0.00 pN

200 250 300 τ / ms

P(τ) τ = 258.66 ± 9.69 ms

-13.62 -13.615 -13.61 μ / pN μ = -13.61 ± 0.00 pN

0.075 0.08 0.085 σ / pN σ = 0.08 ± 0.00 pN

20 25 30 τ / ms τ = 25.15 ± 0.91 ms