-14.054 -14.053 -14.052 μ / pN

P(μ) μ = -14.05 ± 0.00 pN

0.0755 0.076 0.0765 0.077 σ / pN

P(σ) σ = 0.08 ± 0.00 pN

600 700 800 τ / ms

P(τ) τ = 686.25 ± 28.80 ms

-13.46 -13.45 -13.44 μ / pN μ = -13.45 ± 0.00 pN

0.08 0.085 0.09 σ / pN σ = 0.09 ± 0.00 pN

15 20 25 τ / ms τ = 17.22 ± 0.76 ms