-15.294 -15.292 -15.29 μ / pN

P(μ) μ = -15.29 ± 0.00 pN

0.175 0.18 0.185 σ / pN

P(σ) σ = 0.18 ± 0.00 pN

60 70 80 90 τ / ms

P(τ) τ = 75.02 ± 2.18 ms

-14.18 -14.175 -14.17 μ / pN μ = -14.18 ± 0.00 pN

0.175 0.18 0.185 σ / pN σ = 0.18 ± 0.00 pN

45 50 55 60 τ / ms τ = 53.05 ± 1.46 ms