-14.982 -14.98 -14.978 μ / pN

P(μ) μ = -14.98 ± 0.00 pN

0.18 0.182 0.184 σ / pN

P(σ) σ = 0.18 ± 0.00 pN

140 160 180 200 τ / ms

P(τ) τ = 163.98 ± 4.82 ms

-13.87 -13.865 -13.86 μ / pN μ = -13.87 ± 0.00 pN

0.185 0.19 0.195 0.2 σ / pN σ = 0.19 ± 0.00 pN

25 30 35 τ / ms τ = 31.82 ± 0.91 ms