-14.554 -14.552 -14.55 μ / pN

P(μ) μ = -14.55 ± 0.00 pN

0.168 0.17 0.172 σ / pN

P(σ) σ = 0.17 ± 0.00 pN

400 500 600 700 τ / ms

P(τ) τ = 553.25 ± 25.24 ms

-13.45 -13.44 -13.43 μ / pN μ = -13.44 ± 0.00 pN

0.18 0.19 0.2 σ / pN σ = 0.19 ± 0.00 pN

15 20 25 τ / ms τ = 17.84 ± 0.75 ms