-15.745 -15.74 -15.735 μ / pN

P(μ) μ = -15.74 ± 0.00 pN

0.16 0.165 0.17 0.175 σ / pN

P(σ) σ = 0.16 ± 0.00 pN

20 25 30 τ / ms

P(τ) τ = 26.73 ± 0.95 ms

-14.6 -14.595 -14.59 μ / pN μ = -14.60 ± 0.00 pN

0.16 0.165 0.17 σ / pN σ = 0.16 ± 0.00 pN

100 120 140 τ / ms τ = 119.11 ± 4.08 ms