-16.08 -16.06 -16.04 μ / pN

P(μ) μ = -16.06 ± 0.00 pN

0.175 0.18 0.185 0.19 σ / pN

P(σ) σ = 0.18 ± 0.00 pN

10 12 14 16 τ / ms

P(τ) τ = 12.90 ± 0.47 ms

-14.946 -14.944 -14.942 μ / pN μ = -14.94 ± 0.00 pN

0.163 0.164 0.165 0.166 σ / pN σ = 0.16 ± 0.00 pN

200 250 300 τ / ms τ = 246.28 ± 9.29 ms