-16.32 -16.3 -16.28 μ / pN

P(μ) μ = -16.31 ± 0.00 pN

0.18 0.19 0.2 0.21 σ / pN

P(σ) σ = 0.20 ± 0.00 pN

6 7 8 9 τ / ms

P(τ) τ = 7.59 ± 0.29 ms

-15.198 -15.196 -15.194 μ / pN μ = -15.20 ± 0.00 pN

0.164 0.166 0.168 σ / pN σ = 0.17 ± 0.00 pN

400 450 500 550 τ / ms τ = 476.16 ± 19.56 ms