-14.44 -14.438 -14.436 μ / pN

P(μ) μ = -14.44 ± 0.00 pN

0.171 0.172 0.173 0.174 σ / pN

P(σ) σ = 0.17 ± 0.00 pN

600 800 1000 τ / ms

P(τ) τ = 811.60 ± 40.31 ms

-13.36 -13.35 -13.34 -13.33 μ / pN μ = -13.34 ± 0.00 pN

0.18 0.19 0.2 σ / pN σ = 0.19 ± 0.00 pN

10 15 20 τ / ms τ = 15.61 ± 0.75 ms