-14.962 -14.96 -14.958 μ / pN

P(μ) μ = -14.96 ± 0.00 pN

0.13 0.132 0.134 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

70 75 80 85 τ / ms

P(τ) τ = 76.33 ± 1.76 ms

-13.85 -13.845 -13.84 μ / pN μ = -13.85 ± 0.00 pN

0.140.1420.1440.1460.1480.15 σ / pN σ = 0.15 ± 0.00 pN

24 26 28 30 τ / ms τ = 27.32 ± 0.61 ms