-14.634 -14.632 -14.63 μ / pN

P(μ) μ = -14.63 ± 0.00 pN

0.135 0.136 0.137 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

140 160 180 200 τ / ms

P(τ) τ = 170.11 ± 5.36 ms

-13.565 -13.56 -13.555 μ / pN μ = -13.56 ± 0.00 pN

0.155 0.16 0.165 0.17 σ / pN σ = 0.16 ± 0.00 pN

12 14 16 18 τ / ms τ = 15.14 ± 0.48 ms