-14.396 -14.394 -14.392 μ / pN

P(μ) μ = -14.39 ± 0.00 pN

0.142 0.143 0.144 0.145 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

250 300 350 τ / ms

P(τ) τ = 308.33 ± 11.48 ms

-13.36 -13.35 -13.34 -13.33 μ / pN μ = -13.35 ± 0.00 pN

0.17 0.175 0.18 0.185 σ / pN σ = 0.18 ± 0.00 pN

8 10 12 τ / ms τ = 9.99 ± 0.34 ms