-15.11 -15.105 -15.1 μ / pN

P(μ) μ = -15.11 ± 0.00 pN

0.164 0.166 0.168 σ / pN

P(σ) σ = 0.17 ± 0.00 pN

35 40 45 τ / ms

P(τ) τ = 39.65 ± 0.85 ms

-14.065 -14.06 -14.055 μ / pN μ = -14.06 ± 0.00 pN

0.176 0.178 0.18 0.182 σ / pN σ = 0.18 ± 0.00 pN

30 35 40 τ / ms τ = 34.22 ± 0.73 ms