-15.61 -15.605 -15.6 μ / pN

P(μ) μ = -15.61 ± 0.00 pN

0.16 0.165 0.17 0.175 σ / pN

P(σ) σ = 0.17 ± 0.00 pN

11 12 13 14 τ / ms

P(τ) τ = 12.32 ± 0.25 ms

-14.536 -14.534 -14.532 μ / pN μ = -14.53 ± 0.00 pN

0.15 0.151 0.152 σ / pN σ = 0.15 ± 0.00 pN

80 90 100 110 τ / ms τ = 95.51 ± 1.97 ms