-15.83 -15.82 -15.81 -15.8 μ / pN

P(μ) μ = -15.81 ± 0.00 pN

0.17 0.175 0.18 0.185 σ / pN

P(σ) σ = 0.18 ± 0.00 pN

7 8 9 10 τ / ms

P(τ) τ = 8.75 ± 0.29 ms

-14.748 -14.746 -14.744 μ / pN μ = -14.75 ± 0.00 pN

0.146 0.148 0.15 σ / pN σ = 0.15 ± 0.00 pN

120 140 160 180 τ / ms τ = 154.88 ± 5.51 ms