-15.242 -15.24 -15.238 μ / pN

P(μ) μ = -15.24 ± 0.00 pN

0.115 0.12 0.125 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

40 45 50 55 τ / ms

P(τ) τ = 48.67 ± 1.59 ms

-14.14 -14.135 -14.13 μ / pN μ = -14.13 ± 0.00 pN

0.118 0.12 0.122 σ / pN σ = 0.12 ± 0.00 pN

60 70 80 90 τ / ms τ = 73.92 ± 2.50 ms