-15.45 -15.445 -15.44 μ / pN

P(μ) μ = -15.44 ± 0.00 pN

0.140.1420.1440.1460.1480.15 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

24 26 28 30 τ / ms

P(τ) τ = 26.65 ± 0.60 ms

-14.366 -14.364 -14.362 μ / pN μ = -14.36 ± 0.00 pN

0.138 0.139 0.14 σ / pN σ = 0.14 ± 0.00 pN

100 110 120 130 τ / ms τ = 116.24 ± 2.61 ms