-15.69 -15.68 -15.67 μ / pN

P(μ) μ = -15.68 ± 0.00 pN

0.16 0.165 0.17 0.175 σ / pN

P(σ) σ = 0.16 ± 0.00 pN

14 16 18 20 τ / ms

P(τ) τ = 17.75 ± 0.66 ms

-14.612 -14.61 -14.608 -14.606 μ / pN μ = -14.61 ± 0.00 pN

0.128 0.13 0.132 σ / pN σ = 0.13 ± 0.00 pN

150 200 250 τ / ms τ = 175.96 ± 6.74 ms