-15.335 -15.33 -15.325 μ / pN

P(μ) μ = -15.33 ± 0.00 pN

0.124 0.126 0.128 0.13 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

35 40 45 50 τ / ms

P(τ) τ = 43.07 ± 1.62 ms

-14.308 -14.306 -14.304 μ / pN μ = -14.31 ± 0.00 pN

0.123 0.124 0.125 0.126 σ / pN σ = 0.12 ± 0.00 pN

100 120 140 160 τ / ms τ = 129.77 ± 5.12 ms