-14.89 -14.885 -14.88 μ / pN

P(μ) μ = -14.89 ± 0.00 pN

0.111 0.112 0.113 0.114 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

120 140 160 τ / ms

P(τ) τ = 141.57 ± 5.17 ms

-13.855 -13.85 -13.845 μ / pN μ = -13.85 ± 0.00 pN

0.12 0.122 0.124 0.126 σ / pN σ = 0.12 ± 0.00 pN

40 50 60 τ / ms τ = 50.11 ± 1.81 ms