-14.686 -14.684 -14.682 μ / pN

P(μ) μ = -14.68 ± 0.00 pN

0.116 0.118 0.12 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

200 250 300 τ / ms

P(τ) τ = 239.03 ± 9.00 ms

-13.65 -13.645 -13.64 μ / pN μ = -13.65 ± 0.00 pN

0.125 0.13 0.135 σ / pN σ = 0.13 ± 0.00 pN

30 35 40 45 τ / ms τ = 37.86 ± 1.39 ms