-14.488 -14.486 -14.484 μ / pN

P(μ) μ = -14.49 ± 0.00 pN

0.123 0.124 0.125 0.126 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

350 400 450 500 τ / ms

P(τ) τ = 416.51 ± 18.22 ms

-13.47 -13.465 -13.46 μ / pN μ = -13.47 ± 0.00 pN

0.145 0.15 0.155 σ / pN σ = 0.14 ± 0.00 pN

25 30 35 τ / ms τ = 29.28 ± 1.25 ms