-14.242 -14.241 -14.24 μ / pN

P(μ) μ = -14.24 ± 0.00 pN

0.11 0.111 0.112 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

600 700 800 900 τ / ms

P(τ) τ = 741.20 ± 35.57 ms

-13.22 -13.21 -13.2 μ / pN μ = -13.21 ± 0.00 pN

0.12 0.13 0.14 σ / pN σ = 0.13 ± 0.00 pN

16 18 20 22 τ / ms τ = 18.65 ± 0.84 ms