-15.675 -15.67 -15.665 μ / pN

P(μ) μ = -15.67 ± 0.00 pN

0.125 0.13 0.135 0.14 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

16 18 20 22 τ / ms

P(τ) τ = 18.51 ± 0.71 ms

-14.638 -14.636 -14.634 μ / pN μ = -14.64 ± 0.00 pN

0.109 0.11 0.111 σ / pN σ = 0.11 ± 0.00 pN

200 250 300 τ / ms τ = 254.82 ± 9.89 ms