-16.01 -16 -15.99 μ / pN

P(μ) μ = -16.00 ± 0.00 pN

0.155 0.16 0.165 0.17 σ / pN

P(σ) σ = 0.16 ± 0.00 pN

7 8 9 10 τ / ms

P(τ) τ = 8.65 ± 0.33 ms

-14.998 -14.996 -14.994 μ / pN μ = -15.00 ± 0.00 pN

0.112 0.113 0.114 σ / pN σ = 0.11 ± 0.00 pN

600 700 800 900 τ / ms τ = 701.42 ± 27.88 ms