-15.215 -15.21 -15.205 μ / pN

P(μ) μ = -15.21 ± 0.00 pN

0.126 0.128 0.13 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

40 45 50 55 τ / ms

P(τ) τ = 47.63 ± 1.36 ms

-14.19 -14.185 -14.18 μ / pN μ = -14.18 ± 0.00 pN

0.125 0.13 0.135 σ / pN σ = 0.13 ± 0.00 pN

55 60 65 70 τ / ms τ = 60.87 ± 1.74 ms