-15.095 -15.09 -15.085 μ / pN

P(μ) μ = -15.09 ± 0.00 pN

0.122 0.124 0.126 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

50 60 70 80 τ / ms

P(τ) τ = 64.38 ± 1.93 ms

-14.06 -14.055 -14.05 μ / pN μ = -14.05 ± 0.00 pN

0.126 0.128 0.13 0.132 σ / pN σ = 0.13 ± 0.00 pN

40 45 50 55 τ / ms τ = 46.30 ± 1.33 ms