-14.964 -14.962 -14.96 μ / pN

P(μ) μ = -14.96 ± 0.00 pN

0.113 0.114 0.115 0.116 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

70 80 90 100 τ / ms

P(τ) τ = 85.88 ± 2.49 ms

-13.935 -13.93 -13.925 μ / pN μ = -13.93 ± 0.00 pN

0.122 0.124 0.126 σ / pN σ = 0.12 ± 0.00 pN

35 40 45 τ / ms τ = 38.71 ± 1.08 ms