-14.764 -14.762 -14.76 μ / pN

P(μ) μ = -14.76 ± 0.00 pN

0.12 0.121 0.122 0.123 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

120 140 160 180 τ / ms

P(τ) τ = 149.93 ± 5.13 ms

-13.74 -13.735 -13.73 μ / pN μ = -13.73 ± 0.00 pN

0.13 0.135 0.14 σ / pN σ = 0.14 ± 0.00 pN

25 30 35 τ / ms τ = 29.27 ± 0.98 ms