-14.435 -14.434 -14.433 μ / pN

P(μ) μ = -14.43 ± 0.00 pN

0.111 0.112 0.113 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

350 400 450 500 τ / ms

P(τ) τ = 425.23 ± 17.11 ms

-13.42 -13.41 -13.4 μ / pN μ = -13.41 ± 0.00 pN

0.135 0.14 0.145 0.15 σ / pN σ = 0.14 ± 0.00 pN

14 16 18 20 τ / ms τ = 16.20 ± 0.62 ms