-14.174 -14.173 -14.172 -14.171 μ / pN

P(μ) μ = -14.17 ± 0.00 pN

0.122 0.123 0.124 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

600 800 1000 1200 τ / ms

P(τ) τ = 856.20 ± 46.40 ms

-13.18 -13.17 -13.16 -13.15 μ / pN μ = -13.16 ± 0.00 pN

0.145 0.15 0.155 0.16 σ / pN σ = 0.15 ± 0.00 pN

10 12 14 16 τ / ms τ = 11.79 ± 0.62 ms