-15.55 -15.54 -15.53 μ / pN

P(μ) μ = -15.54 ± 0.00 pN

0.15 0.155 0.16 σ / pN

P(σ) σ = 0.16 ± 0.00 pN

16 18 20 22 τ / ms

P(τ) τ = 19.76 ± 0.67 ms

-14.528 -14.526 -14.524 μ / pN μ = -14.53 ± 0.00 pN

0.122 0.124 0.126 σ / pN σ = 0.12 ± 0.00 pN

100 120 140 τ / ms τ = 117.65 ± 3.87 ms