-15.81 -15.8 -15.79 μ / pN

P(μ) μ = -15.80 ± 0.00 pN

0.13 0.14 0.15 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

10 11 12 13 τ / ms

P(τ) τ = 11.44 ± 0.38 ms

-14.768 -14.767 -14.766 -14.765 μ / pN μ = -14.77 ± 0.00 pN

0.108 0.109 0.11 0.111 σ / pN σ = 0.11 ± 0.00 pN

150 200 250 τ / ms τ = 213.08 ± 7.55 ms