-14.99 -14.988 -14.986 μ / pN

P(μ) μ = -14.99 ± 0.00 pN

0.1 0.101 0.102 0.103 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

80 100 120 140 τ / ms

P(τ) τ = 110.89 ± 4.03 ms

-13.91 -13.905 -13.9 μ / pN μ = -13.91 ± 0.00 pN

0.112 0.114 0.116 0.118 σ / pN σ = 0.11 ± 0.00 pN

25 30 35 40 τ / ms τ = 34.25 ± 1.22 ms