-14.798 -14.796 -14.794 μ / pN

P(μ) μ = -14.80 ± 0.00 pN

0.102 0.103 0.104 0.105 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

150 200 250 τ / ms

P(τ) τ = 197.81 ± 8.63 ms

-13.73 -13.72 -13.71 μ / pN μ = -13.72 ± 0.00 pN

0.115 0.12 0.125 σ / pN σ = 0.12 ± 0.00 pN

20 25 30 τ / ms τ = 24.28 ± 1.03 ms