-14.637 -14.636 -14.635 -14.634 μ / pN

P(μ) μ = -14.64 ± 0.00 pN

0.097 0.098 0.099 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

250 300 350 τ / ms

P(τ) τ = 304.67 ± 11.35 ms

-13.57 -13.565 -13.56 μ / pN μ = -13.57 ± 0.00 pN

0.12 0.125 0.13 0.135 σ / pN σ = 0.13 ± 0.00 pN

16 18 20 22 τ / ms τ = 19.32 ± 0.71 ms