-14.416 -14.415 -14.414 -14.413 μ / pN

P(μ) μ = -14.42 ± 0.00 pN

0.099 0.1 0.101 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

500 600 700 800 τ / ms

P(τ) τ = 620.59 ± 32.72 ms

-13.36 -13.35 -13.34 μ / pN μ = -13.35 ± 0.00 pN

0.12 0.13 0.14 σ / pN σ = 0.13 ± 0.00 pN

10 15 20 τ / ms τ = 15.78 ± 0.78 ms