-15.275 -15.27 -15.265 μ / pN

P(μ) μ = -15.27 ± 0.00 pN

0.1 0.102 0.104 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

45 50 55 60 τ / ms

P(τ) τ = 52.08 ± 1.68 ms

-14.19 -14.188 -14.186 μ / pN μ = -14.19 ± 0.00 pN

0.104 0.106 0.108 σ / pN σ = 0.11 ± 0.00 pN

50 55 60 65 τ / ms τ = 56.39 ± 1.93 ms