-15.445 -15.44 -15.435 μ / pN

P(μ) μ = -15.44 ± 0.00 pN

0.105 0.11 0.115 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

25 30 35 40 τ / ms

P(τ) τ = 31.80 ± 1.07 ms

-14.36 -14.358 -14.356 μ / pN μ = -14.36 ± 0.00 pN

0.106 0.107 0.108 0.109 σ / pN σ = 0.11 ± 0.00 pN

80 90 100 110 τ / ms τ = 91.94 ± 3.17 ms