-15.77 -15.76 -15.75 μ / pN

P(μ) μ = -15.76 ± 0.00 pN

0.12 0.125 0.13 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

14 16 18 20 τ / ms

P(τ) τ = 16.74 ± 0.52 ms

-14.698 -14.696 -14.694 μ / pN μ = -14.70 ± 0.00 pN

0.103 0.104 0.105 σ / pN σ = 0.10 ± 0.00 pN

140 160 180 200 τ / ms τ = 165.61 ± 5.49 ms