-16.17 -16.16 -16.15 μ / pN

P(μ) μ = -16.16 ± 0.00 pN

0.17 0.175 0.18 0.185 σ / pN

P(σ) σ = 0.18 ± 0.00 pN

6 7 8 9 τ / ms

P(τ) τ = 7.55 ± 0.27 ms

-15.133 -15.132 -15.131 μ / pN μ = -15.13 ± 0.00 pN

0.095 0.096 0.097 σ / pN σ = 0.10 ± 0.00 pN

350 400 450 500 τ / ms τ = 401.93 ± 15.39 ms