-15.46 -15.45 -15.44 μ / pN

P(μ) μ = -15.45 ± 0.00 pN

0.145 0.15 0.155 σ / pN

P(σ) σ = 0.15 ± 0.00 pN

80 100 120 140 τ / ms

P(τ) τ = 105.51 ± 5.64 ms

-14.372 -14.37 -14.368 μ / pN μ = -14.37 ± 0.00 pN

0.14 0.142 0.144 σ / pN σ = 0.14 ± 0.00 pN

200 300 400 τ / ms τ = 282.34 ± 15.44 ms