-15.9 -15.89 -15.88 μ / pN

P(μ) μ = -15.89 ± 0.00 pN

0.145 0.15 0.155 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

30 40 50 τ / ms

P(τ) τ = 37.09 ± 2.17 ms

-14.786 -14.785 -14.784 -14.783 μ / pN μ = -14.79 ± 0.00 pN

0.131 0.132 0.133 σ / pN σ = 0.13 ± 0.00 pN

600 800 1000 1200 τ / ms τ = 884.15 ± 52.25 ms