-15.34 -15.338 -15.336 μ / pN

P(μ) μ = -15.34 ± 0.00 pN

0.13 0.132 0.134 0.136 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

80 90 100 110 τ / ms

P(τ) τ = 96.76 ± 4.13 ms

-14.255 -14.25 -14.245 μ / pN μ = -14.25 ± 0.00 pN

0.132 0.134 0.136 σ / pN σ = 0.13 ± 0.00 pN

150 200 250 τ / ms τ = 205.59 ± 8.98 ms